%\cite{Tansho:IBIC2014-WEPF30}
\bibitem{Tansho:IBIC2014-WEPF30}
    R.~Tansho, T.~Furukawa, Y.~Hara, K.~Mizushima, K.~Noda, N. S.~Saotome, Y.~Saraya, and T.~Shirai,
%   R. Tansho \emph{et al.},
   \textquotedblleft{Study of General Ion Recombination for Beam Monitor used in Particle Radiotherapy}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPF30, pp. 620--623,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPF30, pp. 620--623,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPF30, pp. 620--623,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepf30.pdf},
    2014.
