%\cite{Hara:IBIC2014-WEPF23}
\bibitem{Hara:IBIC2014-WEPF23}
    Y.~Hara, T.~Furukawa, K.~Mizushima, K.~Noda, N. S.~Saotome, Y.~Saraya, T.~Shirai, and R.~Tansho,
%   Y. Hara \emph{et al.},
   \textquotedblleft{Dosimetric Verification of Lateral Profile with a Unique Ionization Chamber in Therapeutic Ion Beams}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPF23, pp. 597--600,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPF23, pp. 597--600,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPF23, pp. 597--600,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepf23.pdf},
    2014.
