%\cite{Noelle:IBIC2014-WEPF15}
\bibitem{Noelle:IBIC2014-WEPF15}
    D.~Nölle,
   \textquotedblleft{Status of the Standard Diagnostic Systems of the European XFEL}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPF15, pp. 569--573,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPF15, pp. 569--573,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPF15, pp. 569--573,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepf15.pdf},
    2014.
