%\cite{Cantero:IBIC2014-WEPF13}
\bibitem{Cantero:IBIC2014-WEPF13}
    E.D.~Cantero, W.~Andreazza, E.~Bravin, and A.G.~Sosa,
   \textquotedblleft{The Status of Beam Diagnostics for the Hie-Isolde Linac at Cern}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPF13, pp. 565--568,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPF13, pp. 565--568,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPF13, pp. 565--568,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepf13.pdf},
    2014.
