%\cite{Fernandes:IBIC2014-WEPF04}
\bibitem{Fernandes:IBIC2014-WEPF04}
    M.F.~Fernandes, J.~Tan, and C.P.~Welsch,
   \textquotedblleft{A Cryogenic Current Comparator for the Low Energy Antiproton Facitities at CERN}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPF04, pp. 530--535,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPF04, pp. 530--535,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPF04, pp. 530--535,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepf04.pdf},
    2014.
