%\cite{Belohrad:IBIC2014-WEPF03}
\bibitem{Belohrad:IBIC2014-WEPF03}
    D.~Belohrad, J.C.A.~Allica, M.~Andersen, W.~Andreazza, G.~Favre, N.~Favre, L.K.~Jensen, L.~Lenardon, and W.~Vollenberg,
%   D. Belohrad \emph{et al.},
   \textquotedblleft{Upgrade of the Fast Beam Intensity Measurement System for the CERN PS Complex}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPF03, pp. 525--529,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPF03, pp. 525--529,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPF03, pp. 525--529,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepf03.pdf},
    2014.
