%\cite{Werner:IBIC2014-WEPF02}
\bibitem{Werner:IBIC2014-WEPF02}
    M.~Werner, T.~Lensch, J.~Lund-Nielsen, Re.~Neumann, D.~Nölle, and N.~Wentowski,
%   M. Werner \emph{et al.},
   \textquotedblleft{A Toroid Based Bunch Charge Monitor System with Machine Protection Features for FLASH and XFEL}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPF02, pp. 521--524,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPF02, pp. 521--524,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPF02, pp. 521--524,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepf02.pdf},
    2014.
