%\cite{Höner:IBIC2014-WEPD26}
\bibitem{Höner:IBIC2014-WEPD26}
    M.~Höner, S.~Khan, and M.~Sommer,
   \textquotedblleft{Bunch-by-Bunch Feedback Systems at the DELTA Storage Ring used for Beam Diagnostics}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPD26, pp. 703--706,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPD26, pp. 703--706,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPD26, pp. 703--706,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepd26.pdf},
    2014.
