%\cite{Xu:IBIC2014-WEPD17}
\bibitem{Xu:IBIC2014-WEPD17}
    C.~Xu, S.~Allison, S. L.~Hoobler, H.-S.~Kang, C.~Kim, S.J.~Lee, D.J.~Martin, G.~Mun, J.J.~Olsen, T.~Straumann, and A.~Young,
%   C. Xu \emph{et al.},
   \textquotedblleft{Commissioning Results of MicroTCA.4 Stripline BPM System}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPD17, pp. 680--683,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPD17, pp. 680--683,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPD17, pp. 680--683,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepd17.pdf},
    2014.
