%\cite{Watkins:IBIC2014-WEPD09}
\bibitem{Watkins:IBIC2014-WEPD09}
    H.A.~Watkins, J.D.~Gilpatrick, and R.C.~McCrady,
   \textquotedblleft{Development of a High Speed Beam Position and Phase Monitoring System for the LANSCE Linac}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPD09, pp. 655--659,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPD09, pp. 655--659,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPD09, pp. 655--659,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepd09.pdf},
    2014.
