%\cite{Cargnelutti:IBIC2014-WEPD07}
\bibitem{Cargnelutti:IBIC2014-WEPD07}
    M.~Cargnelutti, H.~Hassanzadegan, and M.~Žnidarčič,
   \textquotedblleft{Evaluation of Libera Single Pass H for ESS LINAC}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPD07, pp. 647--651,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPD07, pp. 647--651,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPD07, pp. 647--651,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepd07.pdf},
    2014.
