%\cite{Ichimiya:IBIC2014-WEPD04}
\bibitem{Ichimiya:IBIC2014-WEPD04}
    R.~Ichimiya, K.~Furukawa, F.~Miyahara, M.~Satoh, and T.~Suwada,
   \textquotedblleft{High Position Resolution and High Dynamic Range Stripline Beam Position Monitor (BPM) Readout System for the KEKB Injector Linac Towards the SuperKEKB}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WEPD04, pp. 637--641,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WEPD04, pp. 637--641,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WEPD04, pp. 637--641,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/wepd04.pdf},
    2014.
