%\cite{Nebot Del Busto:IBIC2014-WECZB3}
\bibitem{Nebot Del Busto:IBIC2014-WECZB3}
    E.~Nebot Del Busto, M.J.~Boland, E.B.~Holzer, P.D.~Jackson, M.~Kastriotou, E.~Nebot Del Busto, R.P.~Rassool, J.~Schmidt, and C.P.~Welsch,
%   E. Nebot Del Busto \emph{et al.},
   \textquotedblleft{Measurement of Beam Losses Using Optical Fibers at the Australian Synchrotron}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WECZB3, pp. 515--520,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WECZB3, pp. 515--520,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WECZB3, pp. 515--520,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/weczb3.pdf},
    2014.
