%\cite{Geithner:IBIC2014-WECZB1}
\bibitem{Geithner:IBIC2014-WECZB1}
    R.~Geithner, F.~Kurian, R.~Neubert, H.~Reeg, M.~Schwickert, P.~Seidel, and T.~Stöhlker,
%   R. Geithner \emph{et al.},
   \textquotedblleft{A SQUID-Based Beam Current Monitor for FAIR/CRYRING}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper WECZB1, pp. 510--514,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper WECZB1, pp. 510--514,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper WECZB1, pp. 510--514,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/weczb1.pdf},
    2014.
