%\cite{Cheng:IBIC2014-TUPF21}
\bibitem{Cheng:IBIC2014-TUPF21}
    W.X.~Cheng, B.~Bacha, Y.~Hu, O.~Singh, and H.~Xu,
   \textquotedblleft{NSLS2 Visible Synchrotron Light Monitor Diagnostic Beamline Commissioning}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPF21, pp. 369--373,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPF21, pp. 369--373,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPF21, pp. 369--373,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupf21.pdf},
    2014.
