%\cite{Vilcins:IBIC2014-TUPF11}
\bibitem{Vilcins:IBIC2014-TUPF11}
    S.~Vilcins, D.~Lipka,
   \textquotedblleft{Mechanical Design of Cryogenic Vacuum Feedthroughs for X-FEL Button BPMs}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPF11, pp. 332--336,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPF11, pp. 332--336,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPF11, pp. 332--336,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupf11.pdf},
    2014.
