%\cite{Shi:IBIC2014-TUPF10}
\bibitem{Shi:IBIC2014-TUPF10}
    L.~Shi, N.~Baboi, and R.M.~Jones,
   \textquotedblleft{Stability Study of the Higher Order Mode Beam Position Monitors at the Accelerating Cavities at FLASH}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPF10, pp. 327--331,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPF10, pp. 327--331,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPF10, pp. 327--331,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupf10.pdf},
    2014.
