%\cite{Schneekloth:IBIC2014-TUPF09}
\bibitem{Schneekloth:IBIC2014-TUPF09}
    U.~Schneekloth, N.~Görrissen, G.~Kube, J.~Neugebauer, Ru.~Neumann, and F.~Schmidt-Föhre,
%   U. Schneekloth \emph{et al.},
   \textquotedblleft{Calibration of OLYMPUS/DORIS Beam Position Monitors}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPF09, pp. 324--326,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPF09, pp. 324--326,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPF09, pp. 324--326,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupf09.pdf},
    2014.
