%\cite{Lipka:IBIC2014-TUPF07}
\bibitem{Lipka:IBIC2014-TUPF07}
    D.~Lipka, N.~Baboi, R.~Baldinger, R.~Ditter, B.~Keil, W.~Koprek, R.~Kramert, G.~Marinkovic, D.~Nölle, G.~Petrosyan, M.~Roggli, M.~Stadler, and S.~Vilcins,
%   D. Lipka \emph{et al.},
   \textquotedblleft{FLASH Undulator BPM Commissioning and Beam Characterization Results}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPF07, pp. 315--319,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPF07, pp. 315--319,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPF07, pp. 315--319,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupf07.pdf},
    2014.
