%\cite{Baboi:IBIC2014-TUPF06}
\bibitem{Baboi:IBIC2014-TUPF06}
    N.~Baboi, N.~Eddy, B.J.~Fellenz, O.~Hensler, L.~Shi, T.~Wamsat, and P.~Zhang,
%   N. Baboi \emph{et al.},
   \textquotedblleft{Commissioning of the Electronics for HOM-based Beam Diagnostics at the 3.9 GHz Accelerating Module at FLASH}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPF06, pp. 311--314,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPF06, pp. 311--314,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPF06, pp. 311--314,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupf06.pdf},
    2014.
