%\cite{Bartosik:IBIC2014-TUPD25}
\bibitem{Bartosik:IBIC2014-TUPD25}
    M.R.~Bartosik, B.~Dehning, V.~Eremin, E.~Griesmayer, C.~Kurfuerst, M.~Sapinski, and E.~Verbitskaya,
%   M.R. Bartosik \emph{et al.},
   \textquotedblleft{Cryogenic Beam Loss Monitors for the Superconducting Magnets of the LHC}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD25, pp. 471--474,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD25, pp. 471--474,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD25, pp. 471--474,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd25.pdf},
    2014.
