%\cite{Juergensen:IBIC2014-TUPD24}
\bibitem{Juergensen:IBIC2014-TUPD24}
    L.E.~Jürgensen, U.~Bonnes, C.~Burandt, M.~Fischer, F.~Hug, T.~Kürzeder, N.~Pietralla, R.~Stegmann, and M.~Steinhorst,
%   L.E. Juergensen \emph{et al.},
   \textquotedblleft{Installation of a Beam Loss Monitoring System at the S-DALINAC*}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD24, pp. 468--470,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD24, pp. 468--470,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD24, pp. 468--470,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd24.pdf},
    2014.
