%\cite{Chaikovska:IBIC2014-TUPD23}
\bibitem{Chaikovska:IBIC2014-TUPD23}
    I.~Chaikovska, N.~Delerue, and A.~Variola,
   \textquotedblleft{Real-Time Display System for the Optical Fiber Beam Loss Monitor for the PHIL and ThomX Facilities}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD23, pp. 463--467,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD23, pp. 463--467,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD23, pp. 463--467,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd23.pdf},
    2014.
