%\cite{Rota:IBIC2014-TUPD10}
\bibitem{Rota:IBIC2014-TUPD10}
    L.~Rota, C.M.~Caselle, N.~Hiller, A.-S.~Müller, and M.~Weber,
   \textquotedblleft{An Ultrafast Linear Array Detector for Single-Shot Electro-Optical Bunch Profile Measurements}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD10, pp. 435--437,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD10, pp. 435--437,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD10, pp. 435--437,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd10.pdf},
    2014.
