%\cite{Naito:IBIC2014-TUPD08}
\bibitem{Naito:IBIC2014-TUPD08}
    T.~Naito, T.M.~Mitsuhashi,
   \textquotedblleft{YAG:Ce Screen Monitor Using a Gated CCD Camera}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD08, pp. 426--429,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD08, pp. 426--429,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD08, pp. 426--429,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd08.pdf},
    2014.
