%\cite{Zwicker:IBIC2014-TUPD07}
\bibitem{Zwicker:IBIC2014-TUPD07}
    B.~Zwicker, C.~Dorn, P.~Forck, O.K.~Kester, P.~Kowina, and B.~Zwicker,
%   B. Zwicker \emph{et al.},
   \textquotedblleft{Performance Demonstration of the Non-Invasive Bunch Shape Monitor at GSI High Current LINAC}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD07, pp. 421--425,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD07, pp. 421--425,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD07, pp. 421--425,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd07.pdf},
    2014.
