%\cite{Walasek-Hoehne:IBIC2014-TUPD06}
\bibitem{Walasek-Hoehne:IBIC2014-TUPD06}
    B.~Walasek-Höhne, C.~Andre, A.~Bräuning-Demian, H.~Bräuning, R.~Haseitl, T.~Hoffmann, R.~Lonsing, A.~Reiter, C.~Schmidt, and M.~Schwickert,
%   B. Walasek-Hoehne \emph{et al.},
   \textquotedblleft{CUPID: New System for Scintillating Screen Based Diagnostics}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD06, pp. 417--420,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD06, pp. 417--420,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD06, pp. 417--420,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd06.pdf},
    2014.
