%\cite{Andre:IBIC2014-TUPD05}
\bibitem{Andre:IBIC2014-TUPD05}
    C.~Andre, P.~Forck, R.~Haseitl, A.~Reiter, R.~Singh, and B.~Walasek-Höhne,
%   C. Andre \emph{et al.},
   \textquotedblleft{Optimization of Beam Induced Fluorescence Monitors for Profile Measurements of High Current Heavy Ion Beams at GSI}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD05, pp. 412--416,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD05, pp. 412--416,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD05, pp. 412--416,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd05.pdf},
    2014.
