%\cite{Zagel:IBIC2014-TUPD04}
\bibitem{Zagel:IBIC2014-TUPD04}
    J.R.~Zagel, M.L.~Alvarez, B.J.~Fellenz, C.C.~Jensen, C.E.~Lundberg, E.S.M.~McCrory, D.~Slimmer, R.M.~Thurman-Keup, and D.G.~Tinsley,
%   J.R. Zagel \emph{et al.},
   \textquotedblleft{Third Generation Residual Gas Ionization Profile Monitors at Fermilab.}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD04, pp. 408--411,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD04, pp. 408--411,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD04, pp. 408--411,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd04.pdf},
    2014.
