%\cite{Thurman-Keup:IBIC2014-TUPD03}
\bibitem{Thurman-Keup:IBIC2014-TUPD03}
    R.M.~Thurman-Keup, A.H.~Lumpkin, and J.C.T.~Thangaraj,
   \textquotedblleft{Terahertz and Optical Measurement Apparatus for the Fermilab ASTA Injector}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD03, pp. 403--407,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD03, pp. 403--407,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD03, pp. 403--407,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd03.pdf},
    2014.
