%\cite{Thurman-Keup:IBIC2014-TUPD02}
\bibitem{Thurman-Keup:IBIC2014-TUPD02}
    R.M.~Thurman-Keup, M.L.~Alvarez, W.~Blokland, J.~Fitzgerald, C.E.~Lundberg, and P.S.~Prieto,
%   R.M. Thurman-Keup \emph{et al.},
   \textquotedblleft{Electron Beam Profiler for the Fermilab Main Injector}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUPD02, pp. 398--402,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUPD02, pp. 398--402,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUPD02, pp. 398--402,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tupd02.pdf},
    2014.
