%\cite{Bloomer:IBIC2014-TUCZB2}
\bibitem{Bloomer:IBIC2014-TUCZB2}
    C.~Bloomer, J.W.~Flanagan, and G.~Rehm,
   \textquotedblleft{Measurements of Small Vertical Beamsize using a Coded Aperture at Diamond Light Source}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUCZB2, pp. 279--283,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUCZB2, pp. 279--283,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUCZB2, pp. 279--283,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tuczb2.pdf},
    2014.
