%\cite{Ischebeck:IBIC2014-TUCYB3}
\bibitem{Ischebeck:IBIC2014-TUCYB3}
    R.~Ischebeck, P.~Krejcik, H.~Loos, E.~Prat, V.~Schlott, V.G.~Thominet, and M.~Yan,
%   R. Ischebeck \emph{et al.},
   \textquotedblleft{SwissFEL Beam Profile Monitor}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUCYB3, pp. 259--262,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUCYB3, pp. 259--262,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUCYB3, pp. 259--262,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tucyb3.pdf},
    2014.
