%\cite{Rawankar:IBIC2014-TUCYB2}
\bibitem{Rawankar:IBIC2014-TUCYB2}
    A.A.~Rawankar, T.~Akagi, A.S.~Aryshev, Y.~Honda, D.~Jehanno, K.~Sakaue, N.~Terunuma, and J.~Urakawa,
%   A.A. Rawankar \emph{et al.},
   \textquotedblleft{Pulsed Green Laser Wire System  for Effective Inverse Compton Scattering}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper TUCYB2, pp. 254--258,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper TUCYB2, pp. 254--258,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper TUCYB2, pp. 254--258,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/tucyb2.pdf},
    2014.
