%\cite{Nakamura:IBIC2014-THCXB2}
\bibitem{Nakamura:IBIC2014-THCXB2}
    K.G.~Nakamura, Y.H.~Chin, T.~Koseki, H.~Kuboki, M.~Okada, Y.~Shobuda, M.~Tobiyama, and T.~Toyama,
%   K.G. Nakamura \emph{et al.},
   \textquotedblleft{Performance Evaluation of the Intra-Bunch Feedback System at J-PARC Main Ring}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper THCXB2, pp. 727--730,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper THCXB2, pp. 727--730,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper THCXB2, pp. 727--730,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/thcxb2.pdf},
    2014.
