%\cite{Bobb:IBIC2014-MOPF14}
\bibitem{Bobb:IBIC2014-MOPF14}
    L.M.~Bobb, T.~Aumeyr, M.G.~Billing, L.M.~Bobb, E.~Bravin, J.V.~Conway, P.~Karataev, T.~Lefèvre, S.~Mazzoni, and H.~Schmickler,
%   L.M. Bobb \emph{et al.},
   \textquotedblleft{Vertical Beam Size Measurement at CesrTA Using Diffraction Radiation}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPF14, pp. 77--82,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPF14, pp. 77--82,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPF14, pp. 77--82,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopf14.pdf},
    2014.
