%\cite{Lensch:IBIC2014-MOPF13}
\bibitem{Lensch:IBIC2014-MOPF13}
    T.~Lensch, A.~Delfs, V.~Gharibyan, I.~Krouptchenkov, D.~Nölle, M.~Pelzer, H.~Tiessen, M.~Werner, and K.~Wittenburg,
%   T. Lensch \emph{et al.},
   \textquotedblleft{Wire Scanner Installation into the MicroTCA Environment for the European XFEL}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPF13, pp. 73--76,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPF13, pp. 73--76,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPF13, pp. 73--76,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopf13.pdf},
    2014.
