%\cite{Miller:IBIC2014-MOPF08}
\bibitem{Miller:IBIC2014-MOPF08}
    T.A.~Miller, M.R.~Costanzo, W.~Fischer, B.~Frak, D.M.~Gassner, X.~Gu, and A.I.~Pikin,
%   T.A. Miller \emph{et al.},
   \textquotedblleft{Beam Profile Measurements in the RHIC Electron Lens using a Pinhole Detector and YAG Screen}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPF08, pp. 59--63,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPF08, pp. 59--63,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPF08, pp. 59--63,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopf08.pdf},
    2014.
