%\cite{Kosciuk:IBIC2014-MOPF07}
\bibitem{Kosciuk:IBIC2014-MOPF07}
    B.N.~Kosciuk, A.~Blednykh, and S.~Seletskiy,
   \textquotedblleft{Construction and Operational Performance of a Horizontally Adjustable Beam Profile Monitor at NSLS-II}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPF07, pp. 55--58,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPF07, pp. 55--58,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPF07, pp. 55--58,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopf07.pdf},
    2014.
