%\cite{Gassner:IBIC2014-MOPF05}
\bibitem{Gassner:IBIC2014-MOPF05}
    D.M.~Gassner, A.V.~Fedotov, R.L.~Hulsart, D.~Kayran, V.~Litvinenko, R.J.~Michnoff, T.A.~Miller, M.G.~Minty, I.~Pinayev, and M.~Wilinski,
%   D.M. Gassner \emph{et al.},
   \textquotedblleft{Instrumentation for the Proposed Low Energy RHIC Electron Cooling Project with Energy Recovery}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPF05, pp. 49--54,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPF05, pp. 49--54,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPF05, pp. 49--54,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopf05.pdf},
    2014.
