%\cite{Connolly:IBIC2014-MOPF02}
\bibitem{Connolly:IBIC2014-MOPF02}
    R.~Connolly, W.C.~Dawson, J.M.~Fite, H.~Huang, S.E.~Jao, W.~Meng, R.J.~Michnoff, and S.~Tepikian,
%   R. Connolly \emph{et al.},
   \textquotedblleft{RHIC-Style IPMs in the Brookhaven AGS}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPF02, pp. 39--41,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPF02, pp. 39--41,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPF02, pp. 39--41,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopf02.pdf},
    2014.
