%\cite{Weber:IBIC2014-MOPD18}
\bibitem{Weber:IBIC2014-MOPD18}
    J.M.~Weber, C.A.~Lionberger, W.E.~Norum, G.J.~Portmann, C.~Serrano, and E.C.~Williams,
%   J.M. Weber \emph{et al.},
   \textquotedblleft{ALS Timing System Upgrade}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPD18, pp. 187--190,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPD18, pp. 187--190,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPD18, pp. 187--190,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopd18.pdf},
    2014.
