%\cite{Hiller:IBIC2014-MOPD17}
\bibitem{Hiller:IBIC2014-MOPD17}
    N.~Hiller, A.~Borysenko, E.~Hertle, V.~Judin, B.~Kehrer, A.-S.~Müller, M.J.~Nasse, P.~Peier, V.~Schlott, M.~Schuh, P.~Schönfeldt, N.J.~Smale, B.~Steffen, and J.L.~Steinmann,
%   N. Hiller \emph{et al.},
   \textquotedblleft{Single-Shot Electro-Optical Diagnostics at the ANKA Storage Ring}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPD17, pp. 182--186,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPD17, pp. 182--186,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPD17, pp. 182--186,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopd17.pdf},
    2014.
