%\cite{Palm:IBIC2014-MOPD11}
\bibitem{Palm:IBIC2014-MOPD11}
    M.~Palm, E.~Bravin, and S.~Mazzoni,
   \textquotedblleft{Near-Saturation Single-Photon Avalanche Diode Afterpulse and Sensitivity Correction Scheme for the LHC Longitudinal Density Monitor}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPD11, pp. 169--173,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPD11, pp. 169--173,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPD11, pp. 169--173,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopd11.pdf},
    2014.
