%\cite{Veronese:IBIC2014-MOPD10}
\bibitem{Veronese:IBIC2014-MOPD10}
    M.~Veronese, E.~Allaria, P.~Cinquegrana, E.~Ferrari, F.~Rossi, P.~Sigalotti, and C.~Spezzani,
%   M. Veronese \emph{et al.},
   \textquotedblleft{New Results Of FERMI FEL1 EOS Diagnostics With Full Optical Synchronization}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPD10, pp. 165--168,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPD10, pp. 165--168,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPD10, pp. 165--168,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopd10.pdf},
    2014.
