%\cite{Wunderlich:IBIC2014-MOPD08}
\bibitem{Wunderlich:IBIC2014-MOPD08}
    S.~Wunderlich, E.~Hass, B.~Schmidt, and M.~Yan,
   \textquotedblleft{A Double-Prism Spectrometer for the Longitudinal Diagnosis of Femtosecond Electron Bunches with Mid-Infrared Transition Radiation}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPD08, pp. 157--160,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPD08, pp. 157--160,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPD08, pp. 157--160,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopd08.pdf},
    2014.
