%\cite{Felber:IBIC2014-MOPD07}
\bibitem{Felber:IBIC2014-MOPD07}
    M.~Felber, M.K.~Czwalinna, H.T.~Duhme, M.~Fenner, C.~Gerth, M.~Heuer, E.~Janas, T.~Kozak, T.~Lamb, U.~Mavrič, J.M.~Mueller, P.~Peier, P.~Prędki, K.P.~Przygoda, H.~Schlarb, S.~Schulz, B.~Steffen, C.~Sydlo, J.~Szewiński, M.~Titberidze, T.~Walter, R.~Wedel, and F.~Zummack,
%   M. Felber \emph{et al.},
   \textquotedblleft{New MTCA.4-based Hardware Developments for the Control of the Optical Synchronization Systems at DESY}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPD07, pp. 152--156,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPD07, pp. 152--156,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPD07, pp. 152--156,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopd07.pdf},
    2014.
