%\cite{Hempel:IBIC2014-MOPD03}
\bibitem{Hempel:IBIC2014-MOPD03}
    M.~Hempel, K.~Afanaciev, A.I.~Bell, P.R.~Burtowy, A.E.~Dabrowski, H.M.~Henschel, O.~Karacheban, W.~Lange, J.L.~Leonard, W.~Lohmann, R.~Loos, M.~Penno, B.L.~Pollack, D.~Przyborowski, V.~Ryjov, S.~Schuwalow, D.P.~Stickland, R.~Walsh, and A.A.~Zagozdzinska,
%   M. Hempel \emph{et al.},
   \textquotedblleft{Performance and Upgrade of the Fast Beam Condition Monitor at CMS}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPD03, pp. 134--138,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPD03, pp. 134--138,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPD03, pp. 134--138,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopd03.pdf},
    2014.
