%\cite{Thieberger:IBIC2014-MOPD02}
\bibitem{Thieberger:IBIC2014-MOPD02}
    P.~Thieberger, Z.~Altinbas, C.~Carlson, C.~Chasman, M.R.~Costanzo, C.~Degen, K.A.~Drees, W.~Fischer, D.M.~Gassner, X.~Gu, K.~Hamdi, J.~Hock, Y.~Luo, A.~Marusic, T.A.~Miller, M.G.~Minty, C.~Montag, A.I.~Pikin, and S.M.~White,
%   P. Thieberger \emph{et al.},
   \textquotedblleft{The Electron Backscattering Detector (eBSD), a New Tool for the Precise Mutual Alignment of the Electron and Ion Beams in Electron Lenses}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOPD02, pp. 129--133,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOPD02, pp. 129--133,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOPD02, pp. 129--133,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/mopd02.pdf},
    2014.
