%\cite{Cheng:IBIC2014-MOIZB1}
\bibitem{Cheng:IBIC2014-MOIZB1}
    W.X.~Cheng, B.~Bacha, K.~Ha, Y.~Hu, M.A.~Maggipinto, J.~Mead, D.~Padrazo, O.~Singh, and H.~Xu,
%   W.X. Cheng \emph{et al.},
   \textquotedblleft{NSLS2 Diagnostic Systems Commissioning and Measurements}\textquotedblright,
%  in \emph{Proc. IBIC2014}, Monterey, CA, USA, paper MOIZB1, pp. 16--23,
%  in \emph{Proc. 3rd Int. Beam Instrumentation Conf.}, Monterey, CA, USA, paper MOIZB1, pp. 16--23,
   in \emph{Proc. 3rd International Beam Instrumentation Conference}, Monterey, CA, USA, paper MOIZB1, pp. 16--23,
    ISBN: 978-3-95450-141-0,
    \url{http://jacow.org/IBIC2014/papers/moizb1.pdf},
    2014.
